
The image is pushed to the following registries, pick the one that you prefer - the container images are identical so you only need one;

* Dockerhub container image: link:https://hub.docker.com/r/jamesread/olivetin/[docker.io/jamesread/olivetin]
* GitHub container image: link:https://ghcr.io/olivetin/olivetin[ghcr.io/jamesread/olivetin]

