[#apache-path]
[#apache-dns]
= Apache HTTPD

include::partial$reverse-proxies/diagram.adoc[]

This is an example of how to setup a DNS name based Apache HTTPD proxy for OliveTin. It assumes OliveTin is running on localhost, port 1337.

./etc/httpd/conf.d/OliveTin.conf
[source,apache]
----
<VirtualHost *:80>
ServerName olivetin.example.com
ProxyPreserveHost On
ProxyPass / http://localhost:1337/
ProxyPassReverse / http://localhost:1337/

# Optional: increase timeout for long-lived websocket connections.
# The websocket endpoint is api/olivetin.api.v1.OliveTinApiService/EventStream (default may drop it).
ProxyTimeout 600
</VirtualHost>
----

[NOTE]
====
Apache's default proxy timeouts are short for long-lived connections. Without increasing them, the websocket to `api/olivetin.api.v1.OliveTinApiService/EventStream` is likely to disconnect regularly. OliveTin will attempt to reconnect automatically, but setting `ProxyTimeout` (or a per-route `timeout=` on the websocket `ProxyPass`) avoids unnecessary disconnects.
====

Note, you virtual host should *not* include a DocumentRoot directive - httpd is just proxying OliveTin, not serving it's actual pages.

If you proxy the websocket path explicitly, set a per-route timeout (place these *before* the general `ProxyPass /`):

[source,apache]
----
ProxyPreserveHost On
ProxyPass /api/olivetin.api.v1.OliveTinApiService/EventStream ws://127.0.0.1:1337/api/olivetin.api.v1.OliveTinApiService/EventStream timeout=600
ProxyPassReverse /api/olivetin.api.v1.OliveTinApiService/EventStream ws://127.0.0.1:1337/api/olivetin.api.v1.OliveTinApiService/EventStream

# Optional global default for proxied backends
ProxyTimeout 600
----

